;-----------------------------------------------------
;   calldib.def - call PMDIB 1.0 dll from Full Screen
;-----------------------------------------------------

NAME          calldib   WINDOWAPI

DESCRIPTION   'call PMDIB 1.0 dll from Full Screen'
PROTMODE
HEAPSIZE      4096
STACKSIZE     32768
IMPORTS       PMDIBDLL.PMDIBDLL
